<script setup lang="ts">
import 频谱图数据 from './_频谱图_fftSize65536_32768条.json';

const compRef = useTemplateRef('compRef');

onMounted(() => {
  console.debug('[onMounted] page 加载完成');
  compRef.value!.执行画图(
    频谱图数据, // 实际数据点为32768
    65_536, // FFT大小为65536
    96_000, // 采样率为96000
  );
});
</script>

<template>
  <IframePlotlyJsComp ref="compRef" style="width: 1400px; height: 400px; max-width: 100%" />
</template>

<style scoped></style>
